Title: Analyze Energy Flow Charts
Course: GG 22/23 Leuphana-Copy > Section: 2.7 Green // Energy

The Lawrence Livermore National Laboratory (LLNL) is an American governmental research facility situated in the city of Livermore, California. The LLNL is managed by the Lawrence Livermore National Security and the Department of Energy’s National Nuclear Security Administration.

Each year, the Lawrence Livermore National Laboratory produces a diagram of energy flow in the United States. The Energy Flow Chart displays assessments of energy supply and usage as well as an overall view of complex series of relations between energy sources and the different sectors of the economy. These flow charts help decision makers visualize and understand the complex interrelationships involved in managing U.S. energy resources. In this task, you will put yourself in the shoes of a decision maker and take your decision based on the analysis of the flow chart.

1. Before taking the quiz, watch the following two videos below:

Why do we need flowcharts?

How to analyze flowcharts?